T1BINARY(1) T1BINARY(1)

NAME

t1binary − convert type-1 font from ASCII to binary

SYNOPSIS

t1binary [ −l length ] [ input [ output ] ]

DESCRIPTION t1binary converts Adobe type-1 font programs in PFA (hexadecimal) format to PFB (binary) format. If the file output is not specified output goes to the standard output. If the file input is not specified input comes from the standard input. In this way t1binary can be used as a filter.

OPTIONS

−l length Set the maximum length of sections in PFB output to length. Default value is large, 2**17 - 6, yielding section size, including section header, of 128 Kbytes.

SEE ALSO

t1disasm(1), t1asm(1), t1ascii(1),

Adobe Type 1 Font Format

BUGS

None known.

AUTHOR

Lee Hetherington (ilh@lcs.mit.edu)

5/21/92 1