% Fichier ex11.1.3-3.tex - Ch. Rolland/O Reilly France
\documentclass{article}
\usepackage[latin1]{inputenc}
\begin{document}
\newfont{\normal}{cmfi10}
\newfont{\gros}{cmfi10 scaled \magstep2}
...
{\normal Taille Normale}

{\gros Taille magstep2}
\end{document}
